360.0mm

330.0mm

340.0mm

110.0mm

310.0mm

293.4mm

330.0mm

100.0mm

433.6mm

115.0mm

266.5mm 50.0mm

330.0mm

139.3mm

110.0mm

186.7mm

4 x 8 x 3/4" plywood

120.0mm